ALTER TABLE tenant_settings
  ADD COLUMN pdf_show_empty_rows TINYINT(1) NOT NULL DEFAULT 1 AFTER negative_warning_cents,
  ADD COLUMN pdf_split_mode VARCHAR(20) NOT NULL DEFAULT 'drinking_behavior' AFTER pdf_show_empty_rows;
